X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/f9ae81bddd61b9749df987e6c8ee9263ae464705..05e60b87508bd655b2fa1d183299f59161df1f08:/src/components/UrlSubmitForm.svelte

diff --git a/src/components/UrlSubmitForm.svelte b/src/components/UrlSubmitForm.svelte
index a3dfaa0..01feea1 100644
--- a/src/components/UrlSubmitForm.svelte
+++ b/src/components/UrlSubmitForm.svelte
@@ -12,6 +12,9 @@
       if (['checkbox', 'radio'].indexOf(field.type) > -1 && !field.checked) return;
       if (typeof field.value === 'undefined' || field.value === '') return;
 
+      // Default value for /search endpoint
+      if (field.name === 'dedupe' && (field.value === 1 || field.value === '1')) return;
+
       params.set(field.name, field.value);
     });
 
