X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/f9ae81bddd61b9749df987e6c8ee9263ae464705..2f8b33afce5cd34432db91fbd4d6950bd38359a3:/src/components/SearchSectionReverse.svelte

diff --git a/src/components/SearchSectionReverse.svelte b/src/components/SearchSectionReverse.svelte
index a455a4e..e8f1a47 100644
--- a/src/components/SearchSectionReverse.svelte
+++ b/src/components/SearchSectionReverse.svelte
@@ -49,6 +49,7 @@
            class="form-control form-control-sm d-inline"
            placeholder="latitude"
            pattern="^-?\d+(\.\d+)?$"
+           autofocus
            bind:value={lat}
            on:change={maybeSplitLatitude} />
   </div>
