X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/f9ae81bddd61b9749df987e6c8ee9263ae464705..b63424c366297d79a9b40cb324d62b5a86bdb310:/src/components/SearchSectionDetails.svelte

diff --git a/src/components/SearchSectionDetails.svelte b/src/components/SearchSectionDetails.svelte
index a779b4f..c30f057 100644
--- a/src/components/SearchSectionDetails.svelte
+++ b/src/components/SearchSectionDetails.svelte
@@ -30,7 +30,8 @@
       <input type="edit"
              class="form-control form-control-sm me-1"
              pattern="^[NWRnwr]?[0-9]+$|.*openstreetmap.*"
-             value="{api_request_params.osmtype || ''}{api_request_params.osmid || ''}{api_request_params.place_id || ''}" />
+             value="{api_request_params.osmtype || ''}{api_request_params.osmid || ''}{api_request_params.place_id || ''}"
+             autofocus />
       </div>
     <div class="col-auto">
       <button type="submit" class="btn btn-primary btn-sm">Show</button>
