X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/f9ae81bddd61b9749df987e6c8ee9263ae464705..c2a3d9e360d60b15cbf71840c2307fb3e0a3ea33:/src/components/LastUpdated.svelte

diff --git a/src/components/LastUpdated.svelte b/src/components/LastUpdated.svelte
index 08be5d9..0d7768d 100644
--- a/src/components/LastUpdated.svelte
+++ b/src/components/LastUpdated.svelte
@@ -65,7 +65,9 @@
     <div class="col-sm-6 text-end">
       {#if last_updated_date}
         Data last updated:
-        <abbr id="data-date" title="{last_updated_date} (UTC timezone)">{timeago.format(new Date(last_updated_date))}</abbr>
+        <abbr id="data-date" title="{last_updated_date} (UTC timezone)">
+          {timeago.format(new Date(last_updated_date))}
+        </abbr>
       {/if}
       (<PageLink page="status">Details</PageLink>)
     </div>
