X-Git-Url: https://git.openstreetmap.org./nominatim-ui.git/blobdiff_plain/f9ae81bddd61b9749df987e6c8ee9263ae464705..f4d0d764b1f1506374849a304bd7322fa3547741:/src/components/Error.svelte

diff --git a/src/components/Error.svelte b/src/components/Error.svelte
index 9267963..e8702b9 100644
--- a/src/components/Error.svelte
+++ b/src/components/Error.svelte
@@ -14,6 +14,6 @@
   <div id="error" class="container-fluid alert-danger py-3 px-4">
     {error_message}
 
-    <button type="button" class="btn-close" aria-label="dismiss" on:click={dismiss_message}></button>
+    <button type="button" class="btn-close float-end" aria-label="dismiss" on:click={dismiss_message}></button>
   </div>
 {/if}
