X-Git-Url: https://git.openstreetmap.org./nominatim.git/blobdiff_plain/f4e958a66d213d0263b560cc2e3037c1a415d2b3..7ea1ef3feb587b58f74784e6802c2e74d90e22cc:/data/words.sql

diff --git a/data/words.sql b/data/words.sql
index f927d000..85578f20 100644
--- a/data/words.sql
+++ b/data/words.sql
@@ -29787,7 +29787,6 @@ st	5557484
 -- prefill word table
 
 select count(make_keywords(v)) from (select distinct svals(name) as v from place) as w where v is not null;
-select count(make_keywords(v)) from (select distinct address->'postcode' as v from place where address ? 'postcode') as w where v is not null;
 select count(getorcreate_housenumber_id(make_standard_name(v))) from (select distinct address->'housenumber' as v from place where address ? 'housenumber') as w;
 
 -- copy the word frequencies
